% keyword macros
\newcommand{\docIBeacon}{iBeacon}


\newcommand{\wifiPropLogScale}{Log-Scale}
\newcommand{\wifiPropLogScaleWalls}{Log-Scale-Walls}
\newcommand{\docLogDistance}{log-distance}
\newcommand{\docLogDistanceWalls}{wall-attenuation-factor}


% misc
\newcommand{\docTXP}{TX-power}
\newcommand{\docEXP}{path loss exponent}

\newcommand{\docsAP}{AP}
\newcommand{\docAPshort}{AP}
\newcommand{\docAP}{access-point}
\newcommand{\docAPs}{access-points}

\newcommand{\docWIFI}{Wi\hbox{-}Fi}
\newcommand{\docBeacon}{\Gls{Beacon}}
\newcommand{\docBeacons}{\Glspl{Beacon}}

\newcommand{\docsRSSI}{RSSI}

\newcommand{\docDSimplex}{downhill-simplex}



% optimizations
\newcommand{\noOptEmpiric}{empiric params}
\newcommand{\optParamsAllAP}{optimization 1}
\newcommand{\optParamsEachAP}{optimization 2}
\newcommand{\optParamsPosEachAP}{optimization 3}
\newcommand{\optPerFloor}{model per floor}
\newcommand{\optPerRegion}{model per region}
